The Handbook
is the core user interface to the desktop.

Introduction
provides a modern and customizable environment for running your favorite applications and accessing your information wherever it may be. Other common attributes of the Desktop include advanced window management and desktop effects, support for KDE Plasma Widgets, integrated search, hardware management and a high degree of customizability.