Workspace Behaviour
This is a module to configure global options for the workspace.
Display informational tooltips on mouse hover 	 If this option is checked, tooltips are displayed hovering items in the panel or on the desktop.
Display visual feedback for status changes 	 If you change ⪚ brightness and volume using the keyboard these status changes are displayed in an OSD.
Single-click to open files and folders 	 This is the default setting. Clicking once on an icon will open it. To select you can drag around the icon(s) or Right click, or simply click and hold to drag it.
Double-click to open files and folders (select icons on first click) 	 If this option is not checked, icons/files will be opened with a single click of the left mouse-button. This default behavior is consistent with what you would expect when you click links in most web browsers. If checked however, icons/files will be opened with a double click, while a single click will only select the icon or file. This is the behavior you may know from other desktops or operating systems.