The Handbook
is a programmer's text editor by .
This handbook documents Version 18.08

Introduction
Welcome to , a programmer's text editor by . Some of 's many features include configurable syntax highlighting for languages ranging from C and C++ to to bash scripts, the ability to create and maintain projects, a multiple document interface (MDI), and a self-contained terminal emulator.
But is more than a programmer's editor. Its ability to open several files at once makes it ideal for editing 's many configuration files. This document was written in .
Editing this manual...